Change in June-July-August average precipitation from 1960-1990 to 2070-2100 from HadCM2 IS92a

180 150W 120W 90W 60W 30W 0 30E 60E 90E 120E 150E 180 90S 60S

30S

0

30N

60N 90N

Units: millimetres per day Mean: 0.1 Min: **** Max: 10.6

-2 -1 -0.5 -0.2 0.2 0.5 1 2

Hadley Centre for Climate Prediction and Research, The Met. Office