Global Mixing Ratios of Anthropogenic Halocarbons

490

515

540 ppt

CFC-12

0.0

2.0

4.0

6.0

8.0

10.0

12.0

14.0

HCFC-142b

HCFC-141b

260

265

270

275

CFC-11

40

60

80

100

120

140

160

1991 1993 1995 1997 1999 2001

CH 3 CCl 3 HCFC-22

CCl 4

CFC-113

2050

2100

2150

2200

2250

2300

1991 1993 1995 1997 1999 2001

Global

Total EECl

~5% down

from

peak

0.0

1.0

2.0

3.0

4.0

5.0

1991 1993 1995 1997 1999 2001

H-1211

H-1301

Montzka et al., NOAA/CMDL