1900 1910 1920 1930 1940 1950 1960 1970 1980 1990 2000 2010 2.0 2.5 3.0 3.5 4.0 4.5 5.0 5.5 6.0 6.5 7.0_{638276120006 0 km}

Moskva (55.8 N,37.6 E)

Annual Mean Temperatures (°C)