Annual average sea ice volume change from HadCM2 IS92a

2000 2010 2020 2030 2040 2050 2060 2070 2080 2090 2100 Year -60

-40

-20

0

20 percent

Northern Hemisphere Southern Hemisphere

Hadley Centre for Climate Prediction and Research, The Met. Office